-- Disable Ole Automation Procedures Server Configuration Option
-- CIS 2.5 Check (Surface Area Reduction)

EXECUTE sp_configure 'show advanced options', 1;
RECONFIGURE;
EXECUTE sp_configure 'Ole Automation Procedures', 0;
RECONFIGURE;
GO
EXECUTE sp_configure 'show advanced options', 0;
RECONFIGURE;