-- Disable xp_cmdshell Server Configuration Option
-- CIS 2.15 Check (Surface Area Reduction)

EXECUTE sp_configure 'show advanced options', 1;
RECONFIGURE;
EXECUTE sp_configure 'xp_cmdshell', 0;
RECONFIGURE;
GO
EXECUTE sp_configure 'show advanced options', 0;
RECONFIGURE;