-- Enable MUST_CHANGE for All SQL Authenticated Logins
-- CIS 4.1 Check (Password Policies)

--Set the MUST_CHANGE option for SQL Authenticated logins when resetting a password:
ALTER LOGIN $(LoginName) WITH PASSWORD = '$(Password)' MUST_CHANGE;

